0 10 20 30 40 50 60 70 80 90 100 0% 10% 20% 30% 40% 50% 60% 70% 80% 90% 100%

Frame

Percentage of Streamline Reuse ratio of the number of the streamlines reused from the previous frame to the number of the streamlines present in the previous frame ratio of the number of the streamlines reused from the previous frame to the number of the streamlines present in the current frame